keo!L..

well.. umm if you are reading this you had some trouble with the
dox!application 4.1a.  the reason this is,.. is because you havent installed
your ansi.sys... (err) to do this.. simply modify your config.sys

(located most likely in):

c:\config.sys
d:\config.sys

whatever drive your hardrive works off of..

then simply add a line to your config.sys saying

device = c:\dos\ansi.sys

or

device = d:\dos\ansi.sys
(depending on locaion of that dir)
well thats it.. your set, reboot your computer and run the exe file again!

l8ters. lst


